    86Aug06 from Sysop
  Welcome to my attempt at getting a Citadel running on a Commodore Amiga.
It seems to be working, but I would like you to try crashing it. Consider
this the Amiga version of Test System. I would also like to thank Hue, Jr.,
Dalnefre', and John Stanley for their help. Enjoy!!


